10^{-2} 10^{-1} 10^0

10^{-1}

10^0

10^1

10^2

10^3

S(ηz ) [rad

-1 m]

Station55,3860-4180 m

NormStrainVar= 257.4117

N = 0.0007118 s^{- 1}

10^{-2} 10^{-1} 10^0

10^{-1}

10^0

10^1

10^2

10^3

Station55,4020-4340 m

NormStrainVar= 77.3858

N = 0.00066178 s^{- 1}

10^{-2} 10^{-1} 10^0

10^{-1}

10^0

10^1

10^2

10^3

Station55,4180-4500 m

NormStrainVar= 64.0073

N = 0.00058349 s^{- 1}